From 887fb8a181146390bccb6eaf5caeb0a84659c750 Mon Sep 17 00:00:00 2001
From: Michal Cmarada <michal.cmarada@pantheon.tech>
Date: Fri, 8 Jun 2018 11:54:53 +0200
Subject: HC2VPP-317 - Implement FIB table management support

changes:
 - Added new custom model vpp-fib-table-management
 - allows management of IPv4 and IPv6 Fib tables for VPP

Change-Id: I3647dd659dbefabab233eacef666c3835e69320d
Signed-off-by: Michal Cmarada <michal.cmarada@pantheon.tech>
---
 fib-management/fib-management-api/asciidoc/Readme.adoc | 7 +++++++
 1 file changed, 7 insertions(+)
 create mode 100644 fib-management/fib-management-api/asciidoc/Readme.adoc

(limited to 'fib-management/fib-management-api/asciidoc/Readme.adoc')

diff --git a/fib-management/fib-management-api/asciidoc/Readme.adoc b/fib-management/fib-management-api/asciidoc/Readme.adoc
new file mode 100644
index 000000000..618be1f36
--- /dev/null
+++ b/fib-management/fib-management-api/asciidoc/Readme.adoc
@@ -0,0 +1,7 @@
+= fib-management-api
+
+Provides vpp-fib-table-management model to store configuration of FIB tables:
+
+- supports IPv4 and IPv6 Fib table configuration
+- uses AddressFamily to distinguish between IPv4 and IPv6 FIB table type
+- uses vni-reference type to store FIB table id
-- 
cgit 1.2.3-korg

