From 6c133f78a35c93e23da8347fe31e1b716d135dfe Mon Sep 17 00:00:00 2001
From: Marek Gradzki <mgradzki@cisco.com>
Date: Thu, 27 Jul 2017 08:02:16 +0200
Subject: Release notes cleanup after releasing hc2vpp 1.17.07

Change-Id: I355e73553345ce12360946d5db2c96253a2d1040
Signed-off-by: Marek Gradzki <mgradzki@cisco.com>
---
 .../src/main/asciidoc/devel_guide/devel_plugin_vpp_tutorial.adoc      | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'release-notes/src/main/asciidoc/devel_guide/devel_plugin_vpp_tutorial.adoc')

diff --git a/release-notes/src/main/asciidoc/devel_guide/devel_plugin_vpp_tutorial.adoc b/release-notes/src/main/asciidoc/devel_guide/devel_plugin_vpp_tutorial.adoc
index 716478788..0ebde3d37 100644
--- a/release-notes/src/main/asciidoc/devel_guide/devel_plugin_vpp_tutorial.adoc
+++ b/release-notes/src/main/asciidoc/devel_guide/devel_plugin_vpp_tutorial.adoc
@@ -609,9 +609,9 @@ Netconf testing guide including Notifications, can be found in Honeycomb/Running
 
 NOTE: Netconf and Restconf are equivalent interfaces to Honeycomb, being capable of providing the same APIs. The only difference is with notifications. Only NETCONF is capable of emitting the notifications.
 
-== Full working sample
+== Full working sample (outdated)
 
-Full working sample on github: https://github.com/marosmars/honeycomb-samples/tree/vpp-plugin
+Full working sample (hc2vpp 1.16.09) on github: https://github.com/marosmars/honeycomb-samples/tree/vpp-plugin
 
 [NOTE]
 ====
-- 
cgit 1.2.3-korg

