From 2ab7e143739a403110bd95b977f5c24d76f4d7af Mon Sep 17 00:00:00 2001
From: Marek Gradzki <mgradzki@cisco.com>
Date: Thu, 16 Nov 2017 11:59:06 +0100
Subject: Update ODL references in BGP documentation

Hc2vpp 18.01 is using ODL Nitrogen since
https://gerrit.fd.io/r/#/c/9258/
and
https://gerrit.fd.io/r/#/c/9259/

Change-Id: I4d7f2b28b0674b7ab7e248caba84e62a21c1c977
Signed-off-by: Marek Gradzki <mgradzki@cisco.com>
---
 .../src/main/asciidoc/user_guide/bgp_in_honeycomb_user_guide.adoc | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'release-notes/src/main/asciidoc/user_guide/bgp_in_honeycomb_user_guide.adoc')

diff --git a/release-notes/src/main/asciidoc/user_guide/bgp_in_honeycomb_user_guide.adoc b/release-notes/src/main/asciidoc/user_guide/bgp_in_honeycomb_user_guide.adoc
index bd917aad3..840869f3c 100644
--- a/release-notes/src/main/asciidoc/user_guide/bgp_in_honeycomb_user_guide.adoc
+++ b/release-notes/src/main/asciidoc/user_guide/bgp_in_honeycomb_user_guide.adoc
@@ -5,7 +5,7 @@ link:release_notes.html[< Home]
 Honeycomb uses link:https://wiki.opendaylight.org/view/BGP_LS_PCEP:BGP_Use_Cases[Opendaylight's BGP]
 as a part of default distribution.
 
-Following guide is based on ODL's link:http://docs.opendaylight.org/en/stable-boron/user-guide/bgp-user-guide.html#overview[BGP User Guide].
+Following guide is based on ODL's link:http://docs.opendaylight.org/en/stable-{project-odl-version}/user-guide/bgp-user-guide.html#overview[BGP User Guide].
 
 == Basic configuration
 
@@ -135,10 +135,10 @@ Here is a sample basic neighbor configuration:
 }
 ----
 
-We can use link:http://docs.opendaylight.org/en/stable-boron/user-guide/bgp-user-guide.html#bgp-test-tool[BGP's testtool]
+We can use link:http://docs.opendaylight.org/en/stable-{project-odl-version}/user-guide/bgp-user-guide.html#bgp-test-tool[BGP's testtool]
 to simulate remote BGP peer:
 
-  java -jar ./target/bgp-testtool-0.6.3-Boron-SR3-executable.jar -ra 127.0.0.1:1790 -la 127.0.0.2:17900 -pr 2 -ll DEBUG --active true -as 65000 -mp true
+  java -jar ./target/bgp-testtool-*-executable.jar -ra 127.0.0.1:1790 -la 127.0.0.2:17900 -pr 2 -ll DEBUG --active true -as 65000 -mp true
 
 After connection is established, testtol will display following message in the log:
 
@@ -737,7 +737,7 @@ Also the same route should appeared in Loc-RIB now:
 
 Honeycomb BGP implementation emits notifications on loc-rib modifications.
 Hc2vpp provides BgpInetModule module which translates
-link:http://docs.opendaylight.org/en/stable-boron/user-guide/bgp-user-guide.html#ip-unicast-api[IPv4/IPv6 unicast]
+link:http://docs.opendaylight.org/en/stable-{project-odl-version}/user-guide/bgp-user-guide.html#ip-unicast-api[IPv4/IPv6 unicast]
 routes from loc-rib into VPP FIB.
 
 The BgpInetModule is disabled by default. To enable it, edit
-- 
cgit 1.2.3-korg

