From 938e017b9a471c078a3bbc2213b4638315b2f8df Mon Sep 17 00:00:00 2001
From: Marek Gradzki <mgradzki@cisco.com>
Date: Mon, 11 Dec 2017 12:02:34 +0100
Subject: Repleace attribte references in bgp_in_honeycomb_user_guide.adoc

Change-Id: Ic9cf2e4dd47fa9a84a81ad2b85e0ab19caa01c2d
Signed-off-by: Marek Gradzki <mgradzki@cisco.com>
---
 .../src/main/asciidoc/user_guide/bgp_in_honeycomb_user_guide.adoc        | 1 +
 1 file changed, 1 insertion(+)

(limited to 'release-notes/src/main/asciidoc/user_guide/bgp_in_honeycomb_user_guide.adoc')

diff --git a/release-notes/src/main/asciidoc/user_guide/bgp_in_honeycomb_user_guide.adoc b/release-notes/src/main/asciidoc/user_guide/bgp_in_honeycomb_user_guide.adoc
index 5b8ac56ac..4b5931caa 100644
--- a/release-notes/src/main/asciidoc/user_guide/bgp_in_honeycomb_user_guide.adoc
+++ b/release-notes/src/main/asciidoc/user_guide/bgp_in_honeycomb_user_guide.adoc
@@ -11,6 +11,7 @@ Following guide is based on ODL's link:http://docs.opendaylight.org/en/stable-{p
 
 BGP HC modules are disabled by default. To enable it, edit
 
+[subs="+attributes"]
   modules/io-fd-honeycomb_minimal-distribution_{project-config-version}-module-config
 
 in distribution dir (/opt/honeycomb in case honeycomb was installed from package):
-- 
cgit 1.2.3-korg

