From 81c9cdfa5a9e91b91d73a6a2b20cff8b612d7de3 Mon Sep 17 00:00:00 2001
From: Maros Marsalek <mmarsale@cisco.com>
Date: Wed, 27 Jul 2016 11:05:51 +0200
Subject: HONEYCOMB-130: Separate v3po plugin from HC infra

Creating folders:
- common/
- infra/
- v3po/
- vpp-common/

Change-Id: I2c39e1b17e39e7c0f0628f44aa5fe08563fa06e4
Signed-off-by: Maros Marsalek <mmarsale@cisco.com>
---
 v3po/translate-spi/Readme.adoc | 4 ----
 1 file changed, 4 deletions(-)
 delete mode 100644 v3po/translate-spi/Readme.adoc

(limited to 'v3po/translate-spi/Readme.adoc')

diff --git a/v3po/translate-spi/Readme.adoc b/v3po/translate-spi/Readme.adoc
deleted file mode 100644
index 755538c07..000000000
--- a/v3po/translate-spi/Readme.adoc
+++ /dev/null
@@ -1,4 +0,0 @@
-= Honeycomb translation layer SPI
-
-Provides root, child and list customizer interfaces for extending readers/writers.
-Customizers can be used to implement actual data reads and writes.
\ No newline at end of file
-- 
cgit 1.2.3-korg

