From 8729bc807367eb10b097e7c9fad2ddf85905994a Mon Sep 17 00:00:00 2001
From: Jan Srnicek <jsrnicek@cisco.com>
Date: Sun, 27 Nov 2016 12:07:00 +0100
Subject: Removed references to old v3po plugin

These(maven part) were causing distribution
export old v3po.json file, which would cause
runtime error due to non-existing keepalive-delay
property

Change-Id: Icde6a8187ff7b1424df18521c2de8279fa7ad33b
Signed-off-by: Jan Srnicek <jsrnicek@cisco.com>
---
 v3po/v3po2vpp/asciidoc/Readme.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'v3po/v3po2vpp/asciidoc/Readme.adoc')

diff --git a/v3po/v3po2vpp/asciidoc/Readme.adoc b/v3po/v3po2vpp/asciidoc/Readme.adoc
index d9fb563ab..db779a10b 100644
--- a/v3po/v3po2vpp/asciidoc/Readme.adoc
+++ b/v3po/v3po2vpp/asciidoc/Readme.adoc
@@ -32,7 +32,7 @@ Current order of v3po-api writers is:
 
 To find out current order in runtime, turn on logging for writer registry:
 
-  log:set TRACE io.fd.honeycomb.v3po.translate.util.write.registry
+  log:set TRACE io.fd.hc2vpp.v3po.translate.util.write.registry
 
 === Readers
 There is not a strict order for readers, but current configuration produces approx. this order:
-- 
cgit 1.2.3-korg

