From 935abe44dceec2762baf0548f5358fa8db8a7636 Mon Sep 17 00:00:00 2001
From: Marek Gradzki <mgradzki@cisco.com>
Date: Mon, 19 Jun 2017 14:44:59 +0200
Subject: Bgp distribution for vpp

Bgp can't be currently included in default distribution,
because that would increase footprint,
even with BGP disabled (HONEYCOMB-358).

Change-Id: I9f0c264fdbc7b283cd05295ea27e88f9bc5f9a45
Signed-off-by: Marek Gradzki <mgradzki@cisco.com>
---
 vpp-integration/bgp-distribution/asciidoc/Readme.adoc | 3 +++
 1 file changed, 3 insertions(+)
 create mode 100644 vpp-integration/bgp-distribution/asciidoc/Readme.adoc

(limited to 'vpp-integration/bgp-distribution/asciidoc/Readme.adoc')

diff --git a/vpp-integration/bgp-distribution/asciidoc/Readme.adoc b/vpp-integration/bgp-distribution/asciidoc/Readme.adoc
new file mode 100644
index 000000000..deff42c1c
--- /dev/null
+++ b/vpp-integration/bgp-distribution/asciidoc/Readme.adoc
@@ -0,0 +1,3 @@
+= bgp-distribution
+
+Adds bgp to vpp-integration-distribution (preserving all features).
\ No newline at end of file
-- 
cgit 1.2.3-korg

