From b65cd89989ead7082089bf6f333e56b03f619606 Mon Sep 17 00:00:00 2001
From: Jan Srnicek <jsrnicek@cisco.com>
Date: Thu, 13 Jul 2017 20:21:01 +0200
Subject: HONEYCOMB-360 - Restconf Northbound Intefaces provider separation

- Restconf configuration included under restconf.json

Change-Id: I45f503d3ef383bd6e3d356308d3212c7314b7a28
Signed-off-by: Jan Srnicek <jsrnicek@cisco.com>
---
 infra/it/memory-benchmark/asciidoc/Readme.adoc | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'infra/it/memory-benchmark/asciidoc/Readme.adoc')

diff --git a/infra/it/memory-benchmark/asciidoc/Readme.adoc b/infra/it/memory-benchmark/asciidoc/Readme.adoc
index 80e2ffb6f..38611dc47 100644
--- a/infra/it/memory-benchmark/asciidoc/Readme.adoc
+++ b/infra/it/memory-benchmark/asciidoc/Readme.adoc
@@ -61,7 +61,11 @@ Committed will always be greater than or equal to used.
  A memory allocation may fail if it attempts to increase the used memory
  such that used > committed even if used <= max would still be true (for example, when the system is low on virtual memory).
 
+== Configuration
 
+Does not start any northbound interfaces, as they are not needed for this case.
+Benchmark with 0 data sample size is just to compare it to each other samples size to
+determine how much data each data sample takes in memory.
 
 
 
-- 
cgit 1.2.3-korg

