From 83efb0ff929801a5a2ab89f6b66c07ed940a309d Mon Sep 17 00:00:00 2001
From: Maros Marsalek <mmarsale@cisco.com>
Date: Thu, 11 Aug 2016 13:04:56 +0200
Subject: HONEYCOMB-19 Minimal distro ans wiring for hc infra

Change-Id: I8f0e577ac91106e6025f7f2f27811f850e1c5253
Signed-off-by: Maros Marsalek <mmarsale@cisco.com>
---
 infra/minimal-distribution/Readme.adoc | 16 ++++++++++++++++
 1 file changed, 16 insertions(+)
 create mode 100644 infra/minimal-distribution/Readme.adoc

(limited to 'infra/minimal-distribution/Readme.adoc')

diff --git a/infra/minimal-distribution/Readme.adoc b/infra/minimal-distribution/Readme.adoc
new file mode 100644
index 000000000..5606b2d2f
--- /dev/null
+++ b/infra/minimal-distribution/Readme.adoc
@@ -0,0 +1,16 @@
+= Honeycomb minimal distribution
+This is a minimal, statically wired distribution of Honeycomb. It wires all the dependencies from Opendaylight with
+Honeycomb infrastructure code in order to provide a lightweight runnable distribution utilizing Google's guice for DI.
+
+It is lightweight because:
+
+1. Not using ODL's config subsystem
+2. Not using ODL's global (clustered) MD-SAL
+3. Wiring only minimal necessary subset of ODL components together
+
+== How to build&use
+Regular maven build (install) creates an ${project.artifactId}-${project.version}-infra.zip (or tar.gz) that can be
+unpacked and HC can be started using honeycomb.sh script
+
+== How to run from IntelliJ
+Just mark the src/config folder as resources root and you should be able to run Main from Intellij
\ No newline at end of file
-- 
cgit 1.2.3-korg

