From 8e0c7007906730fe4547b0265a895ad8a322a7dc Mon Sep 17 00:00:00 2001
From: Maros Marsalek <mmarsale@cisco.com>
Date: Thu, 10 Nov 2016 12:22:28 +0100
Subject: Remove hc2vpp codebase

Moved to a dedicated hc2vpp project in fd.io

Change-Id: I03dc3b3029f21b127a00c69a86bcd8e467896241
Signed-off-by: Maros Marsalek <mmarsale@cisco.com>
---
 lisp/lisp2vpp/asciidoc/Readme.adoc | 3 ---
 1 file changed, 3 deletions(-)
 delete mode 100644 lisp/lisp2vpp/asciidoc/Readme.adoc

(limited to 'lisp/lisp2vpp/asciidoc/Readme.adoc')

diff --git a/lisp/lisp2vpp/asciidoc/Readme.adoc b/lisp/lisp2vpp/asciidoc/Readme.adoc
deleted file mode 100644
index 88c43fd4b..000000000
--- a/lisp/lisp2vpp/asciidoc/Readme.adoc
+++ /dev/null
@@ -1,3 +0,0 @@
-= lisp2vpp
-
-Overview of lisp2vpp
\ No newline at end of file
-- 
cgit 1.2.3-korg

