From 8e0c7007906730fe4547b0265a895ad8a322a7dc Mon Sep 17 00:00:00 2001
From: Maros Marsalek <mmarsale@cisco.com>
Date: Thu, 10 Nov 2016 12:22:28 +0100
Subject: Remove hc2vpp codebase

Moved to a dedicated hc2vpp project in fd.io

Change-Id: I03dc3b3029f21b127a00c69a86bcd8e467896241
Signed-off-by: Maros Marsalek <mmarsale@cisco.com>
---
 .../main/asciidoc/install_guide/install_guide.adoc | 23 ----------------------
 1 file changed, 23 deletions(-)
 delete mode 100644 release-notes/src/main/asciidoc/install_guide/install_guide.adoc

(limited to 'release-notes/src/main/asciidoc/install_guide/install_guide.adoc')

diff --git a/release-notes/src/main/asciidoc/install_guide/install_guide.adoc b/release-notes/src/main/asciidoc/install_guide/install_guide.adoc
deleted file mode 100644
index de2e02eda..000000000
--- a/release-notes/src/main/asciidoc/install_guide/install_guide.adoc
+++ /dev/null
@@ -1,23 +0,0 @@
-== Install guide
-
-Installing binaries:
-
-* link:install_from_available_binary_packages.html[Installing from available binary packages]
-* link:install_from_available_archives.html[Installing from available archives]
-
-=== Manual build
-
-* link:install_manual_build.html[Manual build]
-
-=== Distribution notes
-Honeycomb is packaged as a static set of jars, that are loaded by Honeycomb Main class, where pre-configured plugins are then started.
-
-=== Footprint
-
-Minimal footprint for Honeycomb infrastructure (without any plugins) at rest below 100Mb. For Honeycomb distribution with VPP related plugins, minimal footprint was observed below 150Mb.
-The footprint varies depending on:
-
-* VM load. Under heavier load, JVM tends to release some unused memory used during Honeycomb initialization.
-* Northbound interface configuration (4 interfaces started by default: Restconf HTTP, HTTPS, Netconf TCP, SSH). Minimal footprint can be achieved by using only a single interface.
-* JVM configuration. Even lower footprint numbers can be achieved by using aggressive JVM memory options: -client -Xms20m -Xmx32m -XX:MetaspaceSize=5m -XX:MaxMetaspaceSize=32m -XX:MaxMetaspaceExpansion=1m -Xss512k -XX:+UseSerialGC -Djava.compiler=NONE -Xverify:none -noverify
-* Amount of data stored by Honeycomb.
\ No newline at end of file
-- 
cgit 1.2.3-korg

