From b288fb83f0ebc74ed33a2aabfb68d0e24c1a322c Mon Sep 17 00:00:00 2001
From: Marek Gradzki <mgradzki@cisco.com>
Date: Tue, 3 Oct 2017 14:37:04 +0200
Subject: Update jira project version in relese notes for 1.18.01

Change-Id: Iad1bdd2ab775dff9b207e0777858815edec88be3
Signed-off-by: Marek Gradzki <mgradzki@cisco.com>
---
 release-notes/src/main/asciidoc/release_notes.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'release-notes/src/main/asciidoc/release_notes.adoc')

diff --git a/release-notes/src/main/asciidoc/release_notes.adoc b/release-notes/src/main/asciidoc/release_notes.adoc
index 2c46ff53d..f2228e87e 100644
--- a/release-notes/src/main/asciidoc/release_notes.adoc
+++ b/release-notes/src/main/asciidoc/release_notes.adoc
@@ -17,7 +17,7 @@ For VPP specific distribution of Honeycomb, please refer to https://wiki.fd.io/v
 https://wiki.fd.io/view/Honeycomb/Release_Plans/Release_Plan_{project-public-version}[Release plan]
 
 == Features
-Adding to the list of existing features: https://docs.fd.io/honeycomb/1.17.07/release-notes-aggregator/release_notes.html#_features[1707 feature list]
+Adding to the list of existing features: https://docs.fd.io/honeycomb/1.17.10/release-notes-aggregator/release_notes.html#_features[1710 feature list]
 
 === New features
 * https://jira.fd.io/browse/HONEYCOMB-381[Shutdown handler] - Serves as an utility to properly close shutdown closeable resources(Everything that implements AutoCloseable).
-- 
cgit 1.2.3-korg

