From 8e0c7007906730fe4547b0265a895ad8a322a7dc Mon Sep 17 00:00:00 2001
From: Maros Marsalek <mmarsale@cisco.com>
Date: Thu, 10 Nov 2016 12:22:28 +0100
Subject: Remove hc2vpp codebase

Moved to a dedicated hc2vpp project in fd.io

Change-Id: I03dc3b3029f21b127a00c69a86bcd8e467896241
Signed-off-by: Maros Marsalek <mmarsale@cisco.com>
---
 .../asciidoc/user_guide/user_troubleshooting.adoc    | 20 --------------------
 1 file changed, 20 deletions(-)
 delete mode 100644 release-notes/src/main/asciidoc/user_guide/user_troubleshooting.adoc

(limited to 'release-notes/src/main/asciidoc/user_guide/user_troubleshooting.adoc')

diff --git a/release-notes/src/main/asciidoc/user_guide/user_troubleshooting.adoc b/release-notes/src/main/asciidoc/user_guide/user_troubleshooting.adoc
deleted file mode 100644
index 42215f261..000000000
--- a/release-notes/src/main/asciidoc/user_guide/user_troubleshooting.adoc
+++ /dev/null
@@ -1,20 +0,0 @@
-= Troubleshooting
-
-link:release_notes.html[< Home]
-
-CAUTION:  Trying to fix any Honeycomb issue should start with looking at honeycomb log file (default location: /var/log/honeycomb/)
-
-== Unable to open SSH session
-If following warning is shown when invoking ssh command: WARNING: REMOTE HOST IDENTIFICATION HAS CHANGED!. Just invoke (as suggested by the warning):
-
- ssh-keygen -f ...
-
-== Honeycomb fails to start properly
-First thing to do is to take a look at Honeycomb logs(default location: /var/log/honeycomb/).
-
-If following log message is present: VPP-ERROR: VPP api client connection failed java.io.IOException: Connection returned error -1. Make sure VPP is installed in the system and it's running.
-
-NOTE: If the VPP-ERROR also contains message stating vpp japi out of sync. It indicates incompatible versions of VPP and Honeycomb.
-
-== Honeycomb does not respond
-Check suggestions from previous item: Honeycomb fails to start properly
\ No newline at end of file
-- 
cgit 1.2.3-korg

