From cb9cadad578297ffd78fa8a33670bdf1ab669e7e Mon Sep 17 00:00:00 2001
From: Ed Warnicke <eaw@cisco.com>
Date: Tue, 8 Dec 2015 15:45:58 -0700
Subject: Initial commit of vpp code.

Change-Id: Ib246f1fbfce93274020ee93ce461e3d8bd8b9f17
Signed-off-by: Ed Warnicke <eaw@cisco.com>
---
 vnet/vnet/gre/error.def | 23 +++++++++++++++++++++++
 1 file changed, 23 insertions(+)
 create mode 100644 vnet/vnet/gre/error.def

(limited to 'vnet/vnet/gre/error.def')

diff --git a/vnet/vnet/gre/error.def b/vnet/vnet/gre/error.def
new file mode 100644
index 00000000..161ecc1d
--- /dev/null
+++ b/vnet/vnet/gre/error.def
@@ -0,0 +1,23 @@
+/*
+ * gre_error.def: gre errors
+ *
+ * Copyright (c) 2012 Cisco and/or its affiliates.
+ * Licensed under the Apache License, Version 2.0 (the "License");
+ * you may not use this file except in compliance with the License.
+ * You may obtain a copy of the License at:
+ *
+ *     http://www.apache.org/licenses/LICENSE-2.0
+ *
+ * Unless required by applicable law or agreed to in writing, software
+ * distributed under the License is distributed on an "AS IS" BASIS,
+ * WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
+ * See the License for the specific language governing permissions and
+ * limitations under the License.
+ */
+
+gre_error (NONE, "no error")
+gre_error (UNKNOWN_PROTOCOL, "unknown protocol")
+gre_error (UNSUPPORTED_VERSION, "unsupported version")
+gre_error (PKTS_DECAP, "GRE input packets decapsulated")
+gre_error (PKTS_ENCAP, "GRE output packets encapsulated")
+gre_error (NO_SUCH_TUNNEL, "GRE input packets dropped due to missing tunnel")
-- 
cgit 1.2.3-korg

