From a23197980e40d4d9414bcfaf59005a1dc2a89251 Mon Sep 17 00:00:00 2001
From: sreejith <sreejith.surendrannair@linaro.org>
Date: Wed, 29 Mar 2017 01:15:02 -0400
Subject: Added vpp intial source code from master branch 17.01.1

Change-Id: I81bdace6f330825a1746a853766779dfb24765fd
Signed-off-by: sreejith <sreejith.surendrannair@linaro.org>
---
 vpp/vnet/vnet/gre/error.def | 23 +++++++++++++++++++++++
 1 file changed, 23 insertions(+)
 create mode 100644 vpp/vnet/vnet/gre/error.def

(limited to 'vpp/vnet/vnet/gre/error.def')

diff --git a/vpp/vnet/vnet/gre/error.def b/vpp/vnet/vnet/gre/error.def
new file mode 100644
index 00000000..161ecc1d
--- /dev/null
+++ b/vpp/vnet/vnet/gre/error.def
@@ -0,0 +1,23 @@
+/*
+ * gre_error.def: gre errors
+ *
+ * Copyright (c) 2012 Cisco and/or its affiliates.
+ * Licensed under the Apache License, Version 2.0 (the "License");
+ * you may not use this file except in compliance with the License.
+ * You may obtain a copy of the License at:
+ *
+ *     http://www.apache.org/licenses/LICENSE-2.0
+ *
+ * Unless required by applicable law or agreed to in writing, software
+ * distributed under the License is distributed on an "AS IS" BASIS,
+ * WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
+ * See the License for the specific language governing permissions and
+ * limitations under the License.
+ */
+
+gre_error (NONE, "no error")
+gre_error (UNKNOWN_PROTOCOL, "unknown protocol")
+gre_error (UNSUPPORTED_VERSION, "unsupported version")
+gre_error (PKTS_DECAP, "GRE input packets decapsulated")
+gre_error (PKTS_ENCAP, "GRE output packets encapsulated")
+gre_error (NO_SUCH_TUNNEL, "GRE input packets dropped due to missing tunnel")
-- 
cgit 1.2.3-korg

