From 3859a48b255bf4254f7897b5525a330a856bfad4 Mon Sep 17 00:00:00 2001
From: Ido Barnea <ibarnea@cisco.com>
Date: Sun, 18 Dec 2016 18:22:17 +0200
Subject: Some doc fixes for FAQ and per stream statistics

Signed-off-by: Ido Barnea <ibarnea@cisco.com>
---
 doc/trex_stateless.asciidoc | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'doc/trex_stateless.asciidoc')

diff --git a/doc/trex_stateless.asciidoc b/doc/trex_stateless.asciidoc
index 972a322a..848c9ecf 100755
--- a/doc/trex_stateless.asciidoc
+++ b/doc/trex_stateless.asciidoc
@@ -2878,6 +2878,8 @@ trex>
 ** IPv6 with one VLAN tag (except 82599 which does not support this type of packet)
 
 * Maximum number of concurrent streams (with different pg_id) on which statistics may be collected: 127
+* On x710/xl710 cards, all rx bytes counters (rx-bps, rx-bps-L1, ...) are not supported. This is because we use hardware
+counters which support only packets count on these cards.
 
 Two examples follow, one using the console and the other using the Python API.
 
-- 
cgit 1.2.3-korg

