From fa6068394a80766175b59a2b38b4881ec70e7760 Mon Sep 17 00:00:00 2001
From: Ido Barnea <ibarnea@cisco.com>
Date: Mon, 27 Mar 2017 15:37:21 +0300
Subject: Supporting more flows in stateless flow stats, according to NIC type,
 and running mode

Signed-off-by: Ido Barnea <ibarnea@cisco.com>
---
 doc/trex_stateless.asciidoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'doc/trex_stateless.asciidoc')

diff --git a/doc/trex_stateless.asciidoc b/doc/trex_stateless.asciidoc
index 1ca07a02..1a5c62b7 100755
--- a/doc/trex_stateless.asciidoc
+++ b/doc/trex_stateless.asciidoc
@@ -2839,7 +2839,7 @@ trex>
 ** IPv6 with one VLAN tag (except 82599 which does not support this type of packet).
 ** Since version 2.21, also QinQ (two vlan tags) is supported if using ``--software'' command line argument. Details link:trex_manual.html#_command_line_options[here].
 
-* Maximum number of concurrent streams (with different pg_id) on which statistics may be collected: 127
+* Maximum number of concurrent streams (with different pg_id) on which statistics may be collected: 127. Since version 2.23, if using --software command line flag, maximum supported streams is 1023.
 * On x710/xl710 cards, all rx bytes counters (rx-bps, rx-bps-L1, ...) are not supported. This is because we use hardware
 counters which support only packets count on these cards. +
 Starting from version 2.21, you can specify ``--no-hw-flow-stat'' command line argument in order to make x710 behave like other
-- 
cgit 1.2.3-korg

