TRex Analytics Report
======================
:email: trex.tgen@gmail.com 
:quotes.++:
:numbered:
:web_server_url: https://trex-tgn.cisco.com/trex
:local_web_server_url: csi-wiki-01:8181/trex
:toclevels: 6
:tabledef-default.subs: normal,callouts

include::trex_ga.asciidoc[]

// PDF version - image width variable
ifdef::backend-docbook[]
:p_width: 450
endif::backend-docbook[]

// HTML version - image width variable
ifdef::backend-xhtml11[]
:p_width: 800
endif::backend-xhtml11[]


= Analytics
== Setup: TRex07
.Setup Details
[options='header',halign='center',cols="1,5"]
|=================
| Server: | UCSC-C240-M4SX
| CPU:    | 2 x Intel(R) Xeon(R) CPU E5-2667 v3 @ 3.20GHz
| RAM:    | 65536 @ 2133 MHz
| NICs:   | 2 x Intel Corporation Ethernet Controller X710 
| OS:     | Fedora 18
|=================

image:images/trex07_latest_test_runs.png[title="trex07 test runs",align="left",width={p_width}, link="images/trex07_latest_test_runs.png"]
 
[format="csv", options="header",halign='center']
|===
include::build/images/trex07_latest_test_runs_stats.csv[]
|===

=== Trend: Analysis Over Time

image:images/trex07_trend_graph.png[title="trex07_trend_graph",align="left",width={p_width}, link="images/trex07_trend_graph.png"]

[format="csv", options="header",halign='center']
|===
include::build/images/trex07_trend_stats.csv[]
|===
== Setup: TRex08
.Setup Details
[options='header',halign='center',cols="1,5"]
|=================
| Server: | UCSC-C240-M4SX
| CPU:    | 2 x Intel(R) Xeon(R) CPU E5-2667 v3 @ 3.20GHz
| RAM:    | 65536 @ 2133 MHz
| NICs:   | 2 x Intel Corporation Ethernet Controller X710 
| OS:     | Fedora 18
|=================

image:images/trex08_latest_test_runs.png[title="trex08 test runs",align="left",width={p_width}, link="images/trex08_latest_test_runs.png"]
 
[format="csv", options="header",halign='center']
|===
include::build/images/trex08_latest_test_runs_stats.csv[]
|===

=== Trend: Analysis Over Time

image:images/trex08_trend_graph.png[title="trex08_trend_graph",align="left",width={p_width}, link="images/trex08_trend_graph.png"]

[format="csv", options="header",halign='center']
|===
include::build/images/trex08_trend_stats.csv[]
|===

== Setup: TRex09
.Setup Details
[options='header',halign='center',cols="1,5"]
|=================
| Server: | UCSC-C240-M4SX
| CPU:    | 2 x Intel(R) Xeon(R) CPU E5-2667 v3 @ 3.20GHz
| RAM:    | 65536 @ 2133 MHz
| NICs:   | 2x10G (X710) (8 interfaces) 
| OS:     | Fedora 18
|=================


image:images/trex09_latest_test_runs.png[title="trex09 test runs",align="left",width={p_width}, link="images/trex09_latest_test_runs.png"]
 
[format="csv", options="header",halign='center']
|===
include::build/images/trex09_latest_test_runs_stats.csv[]
|===

=== Trend: Analysis Over Time

image:images/trex09_trend_graph.png[title="trex09_trend_graph",align="left",width={p_width}, link="images/trex09_trend_graph.png"]

[format="csv", options="header",halign='center']
|===
include::build/images/trex09_trend_stats.csv[]
|===
//////////////////////////////////////////////////////////
== Setup: TRex11
.Setup Details
[options='header',halign='center']
|====================================================================================================================
|Name |OS |NICs |Routers 
| trex11 | Fedora 18| 2x10G (X710) (8 interfaces), 1x10G (2 interfaces), 1x1G (4 interfaces) | Loopback on X710 + ASA 5520 + ASA 5512 + ASA 5585-ssp10
|====================================================================================================================

image:images/trex11_latest_test_runs.png[title="trex11 test runs",align="left",width={p_width}, link="images/trex11_latest_test_runs.png"]
 
[format="csv", options="header",halign='center']
|===
include::build/images/trex11_latest_test_runs_stats.csv[]
|===

=== Trend: Analysis Over Time

image:images/trex11_trend_graph.png[title="trex11_trend_graph",align="left",width={p_width}, link="images/trex11_trend_graph.png"]

[format="csv", options="header",halign='center']
|===
include::build/images/trex11_trend_stats.csv[]
|===
//////////////////////////////////////////////////////////////
== Setup: Kiwi02
.Setup Details
[options='header',halign='center',cols="1,5"]
|=================
| CPU:    | 2 x Intel(R) Xeon(R) CPU E5-2650 0 @ 2.00GHz
| RAM:    | 31 Gib
| NICs:   | 2x10G (X710) (4 interfaces) 
| OS:     | Fedora 18
|=================



image:images/kiwi02_latest_test_runs.png[title="trex09 test runs",align="left",width={p_width}, link="images/kiwi02_latest_test_runs.png"]

[format="csv", options="header",halign='center']
|===
include::build/images/kiwi02_latest_test_runs_stats.csv[]
|===

=== Trend: Analysis Over Time

image:images/kiwi02_trend_graph.png[title="kiwi02_trend_graph",align="left",width={p_width}, link="images/kiwi02_trend_graph.png"]

[format="csv", options="header",halign='center']
|===
include::build/images/kiwi02_trend_stats.csv[]
|===




