From c87b66c86201458c0475d50c6e93f1497f9eec2e Mon Sep 17 00:00:00 2001
From: Neale Ranns <nranns@cisco.com>
Date: Thu, 7 Feb 2019 07:26:12 -0800
Subject: ipsec: ipsec-tun protect

please consult the new tunnel proposal at:
  https://wiki.fd.io/view/VPP/IPSec

Type: feature

Change-Id: I52857fc92ae068b85f59be08bdbea1bd5932e291
Signed-off-by: Neale Ranns <nranns@cisco.com>
---
 src/vnet/ipsec-gre/error.def | 26 --------------------------
 1 file changed, 26 deletions(-)
 delete mode 100644 src/vnet/ipsec-gre/error.def

(limited to 'src/vnet/ipsec-gre/error.def')

diff --git a/src/vnet/ipsec-gre/error.def b/src/vnet/ipsec-gre/error.def
deleted file mode 100644
index d84e8ed1759..00000000000
--- a/src/vnet/ipsec-gre/error.def
+++ /dev/null
@@ -1,26 +0,0 @@
-/*
- * Copyright (c) 2016 Cisco and/or its affiliates.
- * Licensed under the Apache License, Version 2.0 (the "License");
- * you may not use this file except in compliance with the License.
- * You may obtain a copy of the License at:
- *
- *     http://www.apache.org/licenses/LICENSE-2.0
- *
- * Unless required by applicable law or agreed to in writing, software
- * distributed under the License is distributed on an "AS IS" BASIS,
- * WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
- * See the License for the specific language governing permissions and
- * limitations under the License.
- */
-/**
- * @file
- * @brief L2-GRE over IPSec errors.
- */
-
-
-ipsec_gre_error (NONE, "no error")
-ipsec_gre_error (UNKNOWN_PROTOCOL, "unknown protocol")
-ipsec_gre_error (UNSUPPORTED_VERSION, "unsupported version")
-ipsec_gre_error (PKTS_DECAP, "GRE input packets decapsulated")
-ipsec_gre_error (PKTS_ENCAP, "GRE output packets encapsulated")
-ipsec_gre_error (NO_SUCH_TUNNEL, "GRE input packets dropped due to missing tunnel")
-- 
cgit 1.2.3-korg

