From c28764fd356632763614ea579f678d8f55eca4c7 Mon Sep 17 00:00:00 2001
From: Florin Coras <fcoras@cisco.com>
Date: Wed, 26 Apr 2017 00:08:42 -0700
Subject: TCP ooo reception fixes

- Improve svm fifo handling of out-of-order segments
- Ensure tsval_recent is updated only if rcv_las falls withing the
  segments's sequence space
- Avoid directly dropping old ACKs
- Improve debugging

Change-Id: I88dbe2394a0ad7eb389a4cc12d013a13733953aa
Signed-off-by: Florin Coras <fcoras@cisco.com>
---
 src/vnet/tcp/tcp_error.def | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'src/vnet/tcp/tcp_error.def')

diff --git a/src/vnet/tcp/tcp_error.def b/src/vnet/tcp/tcp_error.def
index 0d75d9751d7..a4e46d64629 100644
--- a/src/vnet/tcp/tcp_error.def
+++ b/src/vnet/tcp/tcp_error.def
@@ -37,4 +37,5 @@ tcp_error (PKTS_SENT, "Packets sent")
 tcp_error (FILTERED_DUPACKS, "Filtered duplicate ACKs")
 tcp_error (RST_SENT, "Resets sent")
 tcp_error (INVALID_CONNECTION, "Invalid connection")
-tcp_error (NO_WND, "No window")
\ No newline at end of file
+tcp_error (NO_WND, "No window")
+tcp_error (CONNECTION_CLOSED, "Connection closed")
\ No newline at end of file
-- 
cgit 1.2.3-korg

