/*
 * dhcp_proxy_error.def: dhcp proxy errors
 *
 * Copyright (c) 2013 Cisco and/or its affiliates.
 * Licensed under the Apache License, Version 2.0 (the "License");
 * you may not use this file except in compliance with the License.
 * You may obtain a copy of the License at:
 *
 *     http://www.apache.org/licenses/LICENSE-2.0
 *
 * Unless required by applicable law or agreed to in writing, software
 * distributed under the License is distributed on an "AS IS" BASIS,
 * WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
 * See the License for the specific language governing permissions and
 * limitations under the License.
 */

dhcp_proxy_error (NONE, "no error")
dhcp_proxy_error (NO_SERVER, "no dhcp server configured")
dhcp_proxy_error (RELAY_TO_SERVER, "DHCP packets relayed to the server")
dhcp_proxy_error (RELAY_TO_CLIENT, "DHCP packets relayed to clients")
dhcp_proxy_error (OPTION_82_ERROR, "DHCP failed to insert option 82")
dhcp_proxy_error (NO_OPTION_82, "DHCP option 82 missing")
dhcp_proxy_error (BAD_OPTION_82_ITF, "Bad DHCP option 82 interface value")
dhcp_proxy_error (BAD_OPTION_82_ADDR, "Bad DHCP option 82 address value")
dhcp_proxy_error (BAD_FIB_ID, "DHCP option 82 fib-id to fib-index map failure")
dhcp_proxy_error (NO_INTERFACE_ADDRESS, "DHCP no interface address")
dhcp_proxy_error (OPTION_82_VSS_NOT_PROCESSED, "DHCP VSS not processed by DHCP server")
dhcp_proxy_error (BAD_YIADDR, "DHCP packets with bad your_ip_address fields")
dhcp_proxy_error (BAD_SVR_FIB_OR_ADDRESS, "DHCP packets not from DHCP server or server FIB.")
dhcp_proxy_error (PKT_TOO_BIG, "DHCP packets which are too big.")
dhcp_proxy_error (FOR_US, "DHCP packets for local client.")
dhcp_proxy_error (ALLOC_FAIL, "DHCP buffer allocation failures.")
