/*
 * dhcp_proxy_error.def: dhcp proxy errors
 *
 * Copyright (c) 2013 Cisco and/or its affiliates.
 * Licensed under the Apache License, Version 2.0 (the "License");
 * you may not use this file except in compliance with the License.
 * You may obtain a copy of the License at:
 *
 *     http://www.apache.org/licenses/LICENSE-2.0
 *
 * Unless required by applicable law or agreed to in writing, software
 * distributed under the License is distributed on an "AS IS" BASIS,
 * WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
 * See the License for the specific language governing permissions and
 * limitations under the License.
 */

dhcpv6_proxy_error (NONE, "no error")
dhcpv6_proxy_error (NO_SERVER, "no dhcpv6 server configured")
dhcpv6_proxy_error (RELAY_TO_SERVER, "DHCPV6 packets relayed to the server")
dhcpv6_proxy_error (RELAY_TO_CLIENT, "DHCPV6 packets relayed to clients")
dhcpv6_proxy_error (NO_INTERFACE_ADDRESS, "DHCPV6 no interface address")
dhcpv6_proxy_error (WRONG_MESSAGE_TYPE, "DHCPV6 wrong message type.")
dhcpv6_proxy_error (NO_SRC_ADDRESS, "DHCPV6 no srouce IPv6 address configured.")
dhcpv6_proxy_error (NO_CIRCUIT_ID_OPTION, "DHCPv6 reply packets without circuit ID option")
dhcpv6_proxy_error (NO_RELAY_MESSAGE_OPTION, "DHCPv6 reply packets without relay message option")
dhcpv6_proxy_error (BAD_SVR_FIB_OR_ADDRESS, "DHCPv6 packets not from DHCPv6 server or server FIB.")
dhcpv6_proxy_error (PKT_TOO_BIG, "DHCPv6 packets which are too big.")
dhcpv6_proxy_error (WRONG_INTERFACE_ID_OPTION, "DHCPv6 reply to invalid interface.")
